EXPORTS
	gst_interpolation_control_source_get_all
	gst_interpolation_control_source_get_count
	gst_interpolation_control_source_get_type
	gst_interpolation_control_source_new
	gst_interpolation_control_source_set
	gst_interpolation_control_source_set_from_list
	gst_interpolation_control_source_set_interpolation_mode
	gst_interpolation_control_source_unset
	gst_interpolation_control_source_unset_all
	gst_lfo_control_source_get_type
	gst_lfo_control_source_new
	gst_lfo_waveform_get_type
