EXPORTS
	gst_bytestream_destroy
	gst_bytestream_flush
	gst_bytestream_flush_fast
	gst_bytestream_get_status
	gst_bytestream_get_timestamp
	gst_bytestream_length
	gst_bytestream_new
	gst_bytestream_peek
	gst_bytestream_peek_bytes
	gst_bytestream_print_status
	gst_bytestream_read
	gst_bytestream_reset
	gst_bytestream_seek
	gst_bytestream_size_hint
	gst_bytestream_tell
	gst_plugin_desc
	gst_adapter_available
	gst_adapter_available_fast
	gst_adapter_clear
	gst_adapter_flush
	gst_adapter_get_type
	gst_adapter_new
	gst_adapter_peek
	gst_adapter_push
	gst_file_pad_available
	gst_file_pad_eof
	gst_file_pad_error
	gst_file_pad_get_length
	gst_file_pad_get_type
	gst_file_pad_new
	gst_file_pad_read
	gst_file_pad_seek
	gst_file_pad_set_event_function
	gst_file_pad_set_iterate_function
	gst_file_pad_tell
	gst_file_pad_try_read
