EXPORTS
	gst_dmabuf_allocator_alloc
	gst_dmabuf_allocator_new
	gst_dmabuf_memory_get_fd
	gst_fd_allocator_get_type
	gst_fd_memory_get_fd
	gst_is_dmabuf_memory
	gst_is_fd_memory
